#!/bin/sh -
#
# $Id: chk.def,v 1.9 2002/03/27 04:32:57 bostic Exp $
#
# Check to make sure we haven't forgotten to add any interfaces
# to the Win32 libdb.def file.

d=../..

# Test must be run from the top-level directory, not from a test directory.
[ -f $d/LICENSE ] || {
	echo 'FAIL: cannot find source distribution directory.'
	exit 1
}

f=$d/build_win32/libdb.def
t1=__1
t2=__2

exitv=0

sed '/; /d' $f |
    egrep @ |
    awk '{print $1}' |
    sed -e '/db_xa_switch/d' \
	-e '/^__/d' -e '/^;/d' |
    sort > $t1

egrep __P $d/dbinc_auto/ext_prot.in |
    sed '/^[a-z]/!d' |
    awk '{print $2}' |
    sed 's/^\*//' |
    sed '/^__/d' | sort > $t2

if cmp -s $t1 $t2 ; then
	:
else
	echo "<<< libdb.def >>> DB include files"
	diff $t1 $t2
	echo "FAIL: missing items in libdb.def file."
	exitv=1
fi

# Check to make sure we don't have any extras in the libdb.def file.
sed '/; /d' $f |
    egrep @ |
    awk '{print $1}' |
    sed -e '/__db_global_values/d' > $t1

for i in `cat $t1`; do
	if egrep $i $d/*/*.c > /dev/null; then
		:
	else
		echo "$f: $i not found in DB sources"
	fi
done > $t2

test -s $t2 && {
	cat $t2
	echo "FAIL: found unnecessary items in libdb.def file."
	exitv=1
}

exit $exitv
