#------------------------------------------------------------------------------
# Wait for a Program to Terminate
#------------------------------------------------------------------------------
MODULE	libc.nlm
#SCREENNAME "MySQL Tool - Wait for a Program to Terminate"
COPYRIGHT "(c) 2003 Novell, Inc. Portions (c) 2003 MySQL AB. All Rights Reserved."
DESCRIPTION "MySQL Tool - Wait for a Program to Terminate"
VERSION 4, 0
STACKSIZE 65536
XDCDATA ../netware/mysql.xdc
#DEBUG

