/*
** SHUTDOWN.SQL
**
** %Z% generic/upgrade/%M% %I% %G% 
**
**	This script shuts down the server.
**	Reconfigure with override added to install
**		any new configuration values. - tww
*/

reconfigure with override
go

shutdown with nowait
go
